From a786dd45a4ebc6b91936b5e46d0ef0a9befc05af Mon Sep 17 00:00:00 2001
From: Sergeanur <s.anureev@yandex.ua>
Date: Sun, 2 Aug 2020 19:36:50 +0300
Subject: Move sdk and eax

---
 sdk/rwsdk/include/d3d8/errcom.def | 60 +++++++++++++++++++++++++++++++++++++++
 1 file changed, 60 insertions(+)
 create mode 100644 sdk/rwsdk/include/d3d8/errcom.def

(limited to 'sdk/rwsdk/include/d3d8/errcom.def')

diff --git a/sdk/rwsdk/include/d3d8/errcom.def b/sdk/rwsdk/include/d3d8/errcom.def
new file mode 100644
index 00000000..25f44e1e
--- /dev/null
+++ b/sdk/rwsdk/include/d3d8/errcom.def
@@ -0,0 +1,60 @@
+RWECODE(E_RW_BADENGINESTATE,
+        "Engine in incorrect state for this operation")
+RWECODE(E_RW_BADOPEN,
+        "Error opening the file %s")
+RWECODE(E_RW_BADPARAM,
+        "Invalid Parameter passed. %s")
+RWECODE(E_RW_BADVERSION,
+        "The binary file format version is incompatible with this library")
+RWECODE(E_RW_DEBUGSTACK,
+        "Debug Library has Stack Depth mismatch")
+RWECODE(E_RW_DEFAULTPIPELINECREATION,
+        "Creation of a default pipeline (%s) failed")
+RWECODE(E_RW_FRAMENOMATRIX,
+        "The frame does not have an associated matrix")
+RWECODE(E_RW_INVIMAGEDEPTH,
+        "Invalid Image Depth")
+RWECODE(E_RW_INVIMAGEFORMAT,
+        "Image has no pixel memory allocated")
+RWECODE(E_RW_INVIMAGEMASK,
+        "The mask and image are not the same size")
+RWECODE(E_RW_INVIMAGESIZE,
+        "Destination and source images are of differing sizes")
+RWECODE(E_RW_INVRASTERDEPTH,
+        "Invalid Raster depth")
+RWECODE(E_RW_INVRASTERFORMAT,
+        "Unrecognized raster format")
+RWECODE(E_RW_INVRASTERLOCKREQ,
+        "Invalid Raster lock request")
+RWECODE(E_RW_INVRASTERMIPLEVEL,
+        "Invalid Raster mipmap level")
+RWECODE(E_RW_INVRASTERSIZE,
+        "Invalid Raster size")
+RWECODE(E_RW_INVRASTERUNLOCKREQ,
+        "Invalid Raster unlock request")
+RWECODE(E_RW_NOFRAME,
+        "Unable to find Frame")
+RWECODE(E_RW_NOMEM,
+        "Unable to allocate %d bytes of memory")
+RWECODE(E_RW_NOMIPMAPGENERATIONCALLBACK,
+        "No Mipmap generation callback set - use RtMipmapUseDefaultMipmapGenerationCallback")
+RWECODE(E_RW_NOTSSEENABLEDCPU,
+        "Not SSE enabled CPU")
+RWECODE(E_RW_NULLP,
+        "NULL pointer passed to library routine")
+RWECODE(E_RW_PLUGININIT,
+        "Plugin has already been initialized")
+RWECODE(E_RW_PLUGINNOTINIT,
+        "Plugin not initialized")
+RWECODE(E_RW_RANGE,
+        "A supplied parameter was outside the expected range")
+RWECODE(E_RW_READ,
+        "Read error on stream")
+RWECODE(E_RW_REDUNDANT_FUNCTION,
+        "Call to redundant function - scheduled to be dropped from future releases")
+RWECODE(E_RW_WRITE,
+        "Write error on stream")
+RWECODE(E_RX_MESHES_RANGES_OVERLAP,
+	"\n    Geometry is in an invalid format for RxPipeline rendering.\n    There may be visible artifacts and/or decreased performance.\n    Use RpGeometrySortByMaterial.\n    [stream %p type %s]")
+RWECODE(E_RW_STRING_TRUNCATION,
+        "strlen(%s) >= %d; truncating at character #%d  == %c")
-- 
cgit v1.2.3

